\[\frac{{\mathrm{d}}^{n+1}\operatorname{erf}z}{{\mathrm{d}z}^{n+1}}=(-1)^{n}%
\frac{2}{\sqrt{\pi}}H_{n}\left(z\right)e^{-z^{2}},\]