\[\int_{0}^{\infty}e^{-at^{2}+2izt}\,\mathrm{d}t=\frac{1}{2}\sqrt{\frac{\pi}{a}}%
e^{-z^{2}/a}+\frac{i}{\sqrt{a}}F\left(\frac{z}{\sqrt{a}}\right),\]