\[z(1-z)\frac{{\mathrm{d}}^{2}\phi}{{\mathrm{d}z}^{2}}+(1-2z)\frac{\mathrm{d}%
\phi}{\mathrm{d}z}-\tfrac{1}{4}\phi=0.\]