\[\int_{\mathcal{L}_{1}}\int_{\mathcal{L}_{2}}\rho(s,t)w_{1}(s)w_{1}(t)w_{2}(s)w%
_{2}(t)\,\mathrm{d}s\,\mathrm{d}t=0,\]