\[\frac{{\mathrm{d}}^{2}u_{3}}{{\mathrm{d}\gamma}^{2}}+(h-\nu(\nu+1)k^{2}{%
\operatorname{sn}}^{2}\left(\gamma,k\right))u_{3}=0,\]