\[{\operatorname{Mc}^{(3)}_{m}}\left(z,h\right)=\dfrac{e^{\mathrm{i}\phi}}{(\pi h%
\cosh z)^{\ifrac{1}{2}}}\*\left(\mathrm{Fc}_{m}\left(z,h\right)-\mathrm{i}%
\mathrm{Gc}_{m}\left(z,h\right)\right),\]