\[{\operatorname{Mc}^{(2)}_{m}}\left(z,h\right)=\sqrt{\frac{2}{\pi}}\dfrac{1}{g_%
{\mathit{e},m}(h)\operatorname{ce}_{m}\left(0,h^{2}\right)}\*\left(-f_{\mathit%
{e},m}(h)\operatorname{Ce}_{m}\left(z,h^{2}\right)+\dfrac{2}{\pi C_{m}(h^{2})}%
\operatorname{Fe}_{m}\left(z,h^{2}\right)\right),\]