\[{\operatorname{Ms}^{(1)}_{m}}\left(z,h\right)=\sqrt{\dfrac{2}{\pi}}\frac{1}{g_%
{\mathit{o},m}(h)\operatorname{se}_{m}'\left(0,h^{2}\right)}\operatorname{Se}_%
{m}\left(z,h^{2}\right),\]