\[{\operatorname{Mc}^{(1)}_{m}}\left(z,h\right)=\sqrt{\dfrac{2}{\pi}}\dfrac{1}{g%
_{\mathit{e},m}(h)\operatorname{ce}_{m}\left(0,h^{2}\right)}\operatorname{Ce}_%
{m}\left(z,h^{2}\right),\]