\[\int_{0}^{1}t^{\sigma-1}R_{F}\left(0,t,1\right)\,\mathrm{d}t=\tfrac{1}{2}\left%
(\mathrm{B}\left(\sigma,\tfrac{1}{2}\right)\right)^{2},\]