\[\frac{\mathrm{d}}{\mathrm{d}x}\left({\mathrm{e}}^{-x^{2}}H_{n}\left(x\right)%
\right)=-{\mathrm{e}}^{-x^{2}}H_{n+1}\left(x\right),\]