\[\lim_{q\to 1}\frac{\tilde{h}_{n}\left((1-q^{2})^{\frac{1}{2}}x;q\right)}{\left%
(1-q^{2}\right)^{\ifrac{n}{2}}}=2^{-n}H_{n}\left(x\right).\]