\[\mathsf{Q}^{-m}_{\nu}\left(x\right)=(-1)^{m}\frac{\Gamma\left(\nu-m+1\right)}{%
\Gamma\left(\nu+m+1\right)}\mathsf{Q}^{m}_{\nu}\left(x\right),\]