\[P^{\mu}_{\nu}\left(x\right)\sim\frac{\Gamma\left(-\nu-\frac{1}{2}\right)}{\pi^%
{1/2}\Gamma\left(-\mu-\nu\right)(2x)^{\nu+1}},\]