\[P^{-m}_{\nu}\left(x\right)=\left(x^{2}-1\right)^{-m/2}\int_{1}^{x}\!\dots\!%
\int_{1}^{x}P_{\nu}\left(x\right)\left(\!\,\mathrm{d}x\right)^{m},\]