\[\mathsf{Q}^{m}_{\nu}\left(x\right)=(-1)^{m}\left(1-x^{2}\right)^{m/2}\frac{{%
\mathrm{d}}^{m}\mathsf{Q}_{\nu}\left(x\right)}{{\mathrm{d}x}^{m}}.\]