\[P^{-\mu}_{\nu}\left(x\right)=\left(\frac{x-1}{x+1}\right)^{\mu/2}\mathbf{F}%
\left(\nu+1,-\nu;\mu+1;\tfrac{1}{2}-\tfrac{1}{2}x\right),\]