\[\mathscr{W}\left\{P^{-\mu}_{\nu}\left(x\right),\boldsymbol{Q}^{\mu}_{\nu}\left%
(x\right)\right\}=-\frac{1}{\Gamma\left(\nu+\mu+1\right)\left(x^{2}-1\right)},\]