\[\mathscr{W}\left\{\mathsf{P}^{-\mu}_{\nu}\left(x\right),\mathsf{Q}^{\mu}_{\nu}%
\left(x\right)\right\}=\frac{\cos\left(\mu\pi\right)}{1-x^{2}},\]