\[{\left(x^{2}-1\right)^{1/2}P^{\mu+1}_{\nu}\left(x\right)-(\nu-\mu+1)P^{\mu}_{%
\nu+1}\left(x\right)}+(\nu+\mu+1)xP^{\mu}_{\nu}\left(x\right)=0.\]