\[\int_{0}^{\infty}e^{-at}\mathbf{L}_{0}\left(t\right)\,\mathrm{d}t=\frac{2}{\pi%
\sqrt{a^{2}\!-\!1}}\operatorname{arcsin}\left(\frac{1}{a}\right),\]