\[{H^{(1)}_{\nu}}\left(z\right)\sim-{H^{(2)}_{\nu}}\left(z\right)\sim-(i/\pi)%
\Gamma\left(\nu\right)(\tfrac{1}{2}z)^{-\nu},\]