\[\int_{0}^{x}e^{\pm t}t^{\nu}I_{\nu}\left(t\right)\,\mathrm{d}t=\frac{e^{\pm x}%
x^{\nu+1}}{2\nu+1}(I_{\nu}\left(x\right)\mp I_{\nu+1}\left(x\right)),\]