\[\left.\frac{\partial K_{\nu}\left(x\right)}{\partial\nu}\right|_{\nu=\pm\frac{%
1}{2}}=\pm\sqrt{\frac{\pi}{2x}}E_{1}\left(2x\right)e^{x}.\]