\[\int_{0}^{x}t\left({J_{\nu-1}}^{2}\left(t\right)-{J_{\nu+1}}^{2}\left(t\right)%
\right)\,\mathrm{d}t=2\nu{J_{\nu}}^{2}\left(x\right),\]