\[{H^{(1)}_{\frac{1}{2}}}\left(z\right)=-i{H^{(1)}_{-\frac{1}{2}}}\left(z\right)%
=-i\left(\frac{2}{\pi z}\right)^{\frac{1}{2}}e^{iz},\]