\[\sigma_{R}(\theta)=\frac{1}{\sqrt{2\pi}}\int^{R}_{-R}\left(1-\frac{\left|t%
\right|}{R}\right){\mathrm{e}}^{-\mathrm{i}\theta t}F(t)\,\mathrm{d}t,\]