\[\Phi(z)=\Phi(x+\mathrm{i}y)=\frac{\mathrm{i}}{\pi}\int^{\infty}_{-\infty}f(t)%
\frac{1}{(x-t)+\mathrm{i}y}\,\mathrm{d}t,\]