\[\mathscr{L}\mskip-3.0muf\mskip 3.0mu\left(s\right)=\frac{1}{1-{\mathrm{e}}^{-%
as}}\int^{a}_{0}{\mathrm{e}}^{-st}f(t)\,\mathrm{d}t.\]