\[\int^{\infty}_{s}\mathscr{L}\mskip-3.0muf\mskip 3.0mu\left(u\right)\,\mathrm{d%
}u=\mathscr{L}\mskip-3.0muf_{-1}\mskip 3.0mu\left(s\right),\]