\[\mathscr{L}\left(f\right)\left(s\right)=\mathscr{L}\mskip-3.0muf\mskip 3.0mu%
\left(s\right)=\int^{\infty}_{0}{\mathrm{e}}^{-st}f(t)\,\mathrm{d}t.\]