\[f^{(2)}(x)=\frac{{\mathrm{d}}^{2}f}{{\mathrm{d}x}^{2}}=\frac{\mathrm{d}}{%
\mathrm{d}x}\left(\frac{\mathrm{d}f}{\mathrm{d}x}\right),\]